                       W E L C O M E   T O   T H E
           S U B S T A N C E   A B U S E   R E S O U R C E   G U I D E

To install the program, change to the floppy drive (A or B) or CD to the
directory containing the installation files and execute the INSTALL.BAT
program.

You may specify an optional target drive and directory. If you do not,
the system will automatically install to C:\DRUGABUS

To specify an alternate drive/directory, use the following syntax.
INSTALL <target drive> <target directory>

The default values are:
        Target Drive = C:
        Target Directory = \DRUGABUS

Note that you must specify a target drive if you are specifying a target
directory and there MUST be a space between the target drive and the
target directory. If you do not include the space, the installation will
fail.

The application requires 8MB of available disk space. An additional
4.5MB of free space is required for the installation process.
